lab1

0

0.2

0.4

0.6

0.8

1

Precision

3-5 6-9 10-13 14-17 18-21 22-25 26-29 30-33 Number of probes per probe set

NetAffx (default) Hs133A Hs ENSE 7 Hs133A Hs ENSG 7 Hs133A Hs ENST 7 Hs133A Hs ENTREZG 7 Hs133A Hs REFSEQ 7 Hs133A Hs UG 7

lab2

0

0.2

0.4

0.6

0.8

1

Precision

3-5 6-9 10-13 14-17 18-21 22-25 26-29 30-33 Number of probes per probe set

NetAffx (default) Hs133A Hs ENSE 7 Hs133A Hs ENSG 7 Hs133A Hs ENST 7 Hs133A Hs ENTREZG 7 Hs133A Hs REFSEQ 7 Hs133A Hs UG 7

lab3

0

0.2

0.4

0.6

0.8

1

Precision

3-5 6-9 10-13 14-17 18-21 22-25 26-29 30-33 Number of probes per probe set

NetAffx (default) Hs133A Hs ENSE 7 Hs133A Hs ENSG 7 Hs133A Hs ENST 7 Hs133A Hs ENTREZG 7 Hs133A Hs REFSEQ 7 Hs133A Hs UG 7

lab4

0

0.2

0.4

0.6

0.8

1

Precision

3-5 6-9 10-13 14-17 18-21 22-25 26-29 30-33 Number of probes per probe set

NetAffx (default) Hs133A Hs ENSE 7 Hs133A Hs ENSG 7 Hs133A Hs ENST 7 Hs133A Hs ENTREZG 7 Hs133A Hs REFSEQ 7 Hs133A Hs UG 7

lab5

0

0.2

0.4

0.6

0.8

1

Precision

3-5 6-9 10-13 14-17 18-21 22-25 26-29 30-33 Number of probes per probe set

NetAffx (default) Hs133A Hs ENSE 7 Hs133A Hs ENSG 7 Hs133A Hs ENST 7 Hs133A Hs ENTREZG 7 Hs133A Hs REFSEQ 7 Hs133A Hs UG 7